lambda =0.0001 lambda =0.1 lambda =0.2 lambda =0.249 lambda =0.25 lambda =0.251 lambda =0.28 lambda =0.3027 lambda =0.35 lambda =0.4 lambda =0.5 lambda =1 lambda =2 lambda =1000